50 100 150 200

O3 (ppbv)

SONEX DC-8 1997/10/13

40

60

80

CO (ppbv)

306 308 310 312 314

N2O (ppbv)

40 60 80 100 120

H2O (ppmv)

18.02 18.04 18.06 18.08 18.1 18.12 18.14 18.16 6

7

8 zp (km)

UT (h)